|<0.5

η|〉η/d_{ch}Nd〈

210^310

)c (GeV/

〉_Tp〈

0.2 0.4 0.6 0.8 1 1.2 1.4

= 5.02 TeV NNs ALICE, Pb-Pb Uncertainties: stat. (bars), sys. (boxes)

-π+^+π^-+K^+K^0K* pp+ ϕ

ALI-PUB-530668

ALI-PUB-530668